---
title: "Updating your profile"
description: "Learn how to update your profile information including your name, username, and email address in Reactive Resume"
---

<Steps>
  <Step title="Sign in to the dashboard">
    Head over to [https://rxresu.me](https://rxresu.me) and sign in with your account credentials.

    <Tip>
      If you haven't created an account yet, follow the guide on [Creating an Account](/guides/creating-an-account).
    </Tip>
  </Step>

  <Step title="Navigate to Profile settings">
    Once you're in the dashboard, look for the sidebar navigation on the left. Under the <Badge>Settings</Badge> section, click on the <Badge>Profile</Badge> link.
  </Step>

  <Step title="Update your information">
    On the Profile page, you can update the following information:

    - **Name**: Your full name as it appears in your account
    - **Username**: Your unique username (used in public resume URLs)
    - **Email Address**: Your account email address

    <Warning>
      If you update your email address, you will receive a verification link on your current email address. The change will only be accepted after you click on the verification link.
    </Warning>
  </Step>

  <Step title="Verify email changes (if applicable)">
    If you've updated your email address, check your current email inbox for a verification link. Click on the link to confirm the email change.

    <Tip>
      Make sure to check your spam folder if you don't see the verification email in your inbox. The verification link is required to complete the email address change.
    </Tip>
  </Step>
</Steps>
